<template>
  <div className="bottom-right-table-3">
    <dv-scroll-board :config="config1" />
  </div>
</template>

<script>
export default {

  name: 'DigitalFlop',
  data () {
    return {
      config1:  {
        "oddRowBGC": "#ededed33",
        "data": [
          ["<span style=\"font-size: 24px\">---<\/span>", "<span style=\"font-size: 24px\">---<\/span>", "<span style=\"font-size: 24px\">---<\/span>"],
          ["<span style=\"font-size: 24px\">---<\/span>", "<span style=\"font-size: 24px\">---<\/span>", "<span style=\"font-size: 24px\">---<\/span>"]
        ],
        "rowNum": 20,
        "evenRowBGC": "#ededed33",
        "header": ["子任务", "工作站", "位置"],
        "headerBGC": "#000fff82",
        "headerHeight": 60
      }
    }
  },
  mounted () {
    console.log('123123213123131')
    setTimeout(() => {
      this.getListData()
    }, 3500)

    setInterval(this.getListData, 35000)
  },
  methods: {
    getListData () {
      // 这里getList获取到的res是接口返回的所有内容（包含code、msg、data等），里面只有data是业务数据
      this.$axios.post('/api//zwwms/services/rest/rpcService/syncIntoOrder', {
        methodType: 'K4'
      })
        .then(res => {
          this.config1 = res.data.data
        })
    }
  }
}
</script>

<style lang="less">
.bottom-right-table-3 {
  margin: 0 -5px;

  .dv-scroll-board {
    height: calc(~"100% - 60px");
    width: calc(~"100% - 60px");
  }
}
</style>
